\medskip
\noindent\hbox{}\hrule\hbox{}\penalty-1000
\medskip
\noindent Copyright \copyright 1994, 1995, 1996, 1997, 1998 David Neto
\smallskip

\noindent 
   This library is free software; you can redistribute it and/or
   modify it under the terms of the GNU Library General Public
   License as published by the Free Software Foundation; either
   version 2 of the License, or (at your option) any later version.
\smallskip

\noindent 
   This library is distributed in the hope that it will be useful,
   but WITHOUT ANY WARRANTY; without even the implied warranty of
   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
   Library General Public License for more details.
\smallskip

\noindent   
   You should have received a copy of the GNU Library General Public
   License along with this library; if not, write to the
   Free Software Foundation, Inc., 59 Temple Place - Suite 330,
   Boston, MA  02111-1307, USA.
\smallskip

\noindent   
   You may contact David Neto via email at {\tt netod@@acm.org}, or with
   greater latency at
\smallskip
\noindent{\obeylines
     Department of Computer Science,
     University of Toronto,
     10 King's College Rd.,
     Toronto, Ontario,
     M5S 3G4,
     Canada
}
