\documentstyle[12pt,lslide,psfig]{article}
%\documentstyle[12pt,amssymbols,lslide,psfig]{article}
        % <- if amssymbols.sty is available
%\documentstyle[12pt,amstex,amssymb,lslide]{article}
        % <- if you use AmSLaTeX
%\documentstyle[12pt,psfig]{article}


%\pagestyle{myheadings}
%\pagestyle{empty}

\makeatletter
\def\@oddhead{\vbox{\hbox to\hsize{\sl \rightmark \hfill \sl \thepage }}}
\def\@oddfoot{\vbox{\vspace{-20pt} \footmsg \hfill \rm }} %\today}}
\makeatother

%\def\rightmark{WWVM}
\def\footmsg{VPL Snapshots} 

%\landscape
        % <- if your driver can rotate 90 degrees.
        % e.x. in emTeX derivers:
        %  hp filename /tr2
        % \portrait is default.

% Addjust page dimenstions here if necessary. For example:
%\addtolength{\textwidth}{-.3in}
%\addtolength{\textheight}{.5in}
%\addtolength{\topmargin}{.02in}
%\addtolength{\oddsidemargin}{-.03in}
%\addtolength{\evensidemargin}{-.03in}

%\verttop
        % compare it with \vertcenter that is the default

%\ovalframe
%\doubleboxframe % or \ovalframe
        % compare them with \shadowframe that is the default

%\boxsecframe
%\boxsecframe
        % compare it with \shadowsecframe that is the default

\begin{document}
\Large

\date{\empty}

%\titlepage


%\sectioncontents

%\maketitle

\begin{figure}[htb]
\centerline{\psfig{file=vpl-index.ps,width=5.00in}}
\caption{VPL welcome screen. } 
%\label{fig:}
\end{figure}

%\begin{figure}[htb]
%\centerline{\psfig{file=dir-mgr.ps,width=5.00in}}
%\caption{VPL file manager screen.} 
%\label{fig:}
%\end{figure}


\begin{slide}
\begin{figure}[htb]
\centerline{\psfig{file=editor.ps,width=5.00in}}
\caption{VPL file editor screen. } 
%\label{fig:}
\end{figure}

\end{slide}

\begin{figure}[htb]
\centerline{\psfig{file=hpf.ps,width=4.00in}}
\caption{VPL HPF/Fortran 90 module screen. } 
%\label{fig:}
\end{figure}

\begin{figure}[htb]
\centerline{\psfig{file=hpf-out.ps,width=4.00in}}
\caption{Output screen for a submitted HPF/Fortran 90 process. } 
%\label{fig:}
\end{figure}

\begin{figure}[htb]
\centerline{\psfig{file=hpf-tut.ps,width=4.00in}}
\caption{VPL HPF tutorial screen. } 
%\label{fig:}
\end{figure}

\begin{figure}[htb]
\centerline{\psfig{file=mpi.ps,width=5.00in}}
\caption{VPL MPI module screen. } 
%\label{fig:}
\end{figure}






\end{document}

