HPS Adapter

Node 1 (CPU,RAM)

Switch Board

Communication Link

20-80 MB/s

40 MB/s

Communication Link 40 MB/s

HPS Adapter

20-80 MB/s Node 1 (CPU,RAM)

40 MB/s