an AVS remote module in other AVS remote modules for

a remote machine sequential visualization and calculation

. . .

Higher level:

AVS data-flow interface with coarse-grain parallelism for interactive visualization and process control

AVS protocol

Lower level:

CM5 data-parallel or

CMOST host-node protocol message-passing interface with fine-grain parallelism for parallel

. . .

which an AVS/CM interface is embedded (serial interface to a data-parallel subroutine or a host CMMD program) an AVS remote module in which an AVS/CM interface is embedded (serial interface to a data-parallel subroutine or a host CMMD program) an AVS remote module in which an AVS/CM interface is embedded (serial interface to a data-parallel subroutine or a host CMMD program)

CM5’s Control Processor (CP)

CM computation part (a data-parallel subroutine or CMMD node programs)

CM computation part (a data-parallel subroutine or CMMD node programs)

. . .

CM computation part (a data-parallel subroutine or CMMD node programs)

AVS kernel

AVS server machine

computation

CM5’s Processor Nodes (PNs) module/process 1 module/process 2 module/process n