user runtime input

IBM RS/6000 (local machine)

file I/O(optional)

mouse disk

keyboard

Figure 5: System configuration and distributed components

SUN Spar c 2 (remote)

. running computing

modules for calculating equivalent admittance

SUN Spar c 2 (remote)

. running computing

modules for calculating excitation vector [I]

SUN Spar c 1+ (remote)

. control processor(CP)

of the CM5 system

Connection Machine 5

. running computation/

communication intensive modules for calculating [Y^a], [H_0^2], [M], a linear solver

. running/displaying a GUI and system control module

. running AVS kernel and rendering modules . running other aulixary modules for the rendering

(Network Editor, Geometry Viewer, ...)

Local network (Ethernet)

matrix [Y^b] of microwave network

for [V], and [H]