Table 1: Timings of calculations and communications (in second)

Module name Calculationtime

Communication time with ‘Inputinterface-IBM’

Communication time with ‘EM-all-CM5’

Communication time with ‘EM-3D-IBM’

EM-1-SUN 0.1 (Sun) 0.02 0.045

EM-2-SUN 0.6 (Sun) 0.02 0.5

EM-3-CM5 1.8 (CM5) 1260 (Sun)

0.02 0.0

EM-all-CM5 2.1 (CM5) 120 (Sun) 0.5

AVS Rendering Modules

3.5 (550x580 window)

Note: The timing data is measured at a typical case: the number of pulse functions = 64; the number of mode functions = 5, and the number of grid points = 101x101.