SUN4(remote) running BS model

DEC5000 (remote) running AMC model SUN10 (remote) AVS/PVM host

SUN4 (remote) file server(input)

Ethernet (TCP/IP)

IBM RS6000(remote) file server(output)

SUN10 (remote)

SUN10 (remote) running AVS kernel input

SUN10 (home machine)

mouse user runtime

ATM switch

Sonet (OC48)

ATM switch

ATM (OC3c)

NYNET WAN

8-node IBM SP2

Figure 3.2: System Configuration 2 for the Financial Modeling on IBM SP2 and DEC Alpha Farm over NYNET

Ethernet (TCP/IP)

FDDI-based GIGAswitch

8-node DEC Alpha Farm

AVS/PVM host

ATM (OC3c)

PVM node tasks running AMS model

PVM node tasks running EUS model