SUN Spar c 2 (remote)

. running computing

modules for calculating equivalent admittance

SUN Spar c 2 (remote)

. running computing

modules for calculating excitation vector [I]

SUN Spar c 1+ (remote)

. control processor(CP)

of the CM5 system

Connection Machine 5

. running computation/

communication intensive modules for calculating [Y^a], [H_0^2], [M], a linear solver

Local network (Ethernet)

matrix [Y^b] of microwave network

for [V], and [H]

control data or user runtime input

• Running AVS kernel & system modules

• display graphical user input interface, collect user

• executing user graphical output

• supervising data flows in runtime input and send to the input interface • display graphical output in geometry viewers

AVS flow network interface, gathering model results

SUN10 (remote) running AVS kernel

• Displaying GUI

input

SUN10 (home machine)

mouse user runtime

ATM switch

Sonet

(OC48) image data

ATM switch

ATM (OC3c)

ATM (OC3c)

NYNET WAN