microwave network conductor conductor conductor

incident EM field

microwave network conductor conductor conductor

slot 1 slot 2 x y i

i

w w

simulated EMS field area

ε, μ ε, μ d Y_{11}, Y_{12}, Y_{21}, Y_{22} h h

EMS field

slot 1 slot 2

Φ