
\begin{table}
\begin{center}
\begin{tabular}{|c||c|c|c|c|} \hline
            &                  & Communication & Communication & Communication \\
Module name & Calculation time & time with 'Input- & time with & Communication \\
            &                  & interface-IBM' & 'EM-all-CM5' & 'EM-3D-IBM' \\ \hline\hline
EM-1-SUN      & 0.1(Sun)    & 0.02 & 0.045 &     \\\hline
EM-2-SUN      & 0.6(Sun)    & 0.02 & 0.5   &     \\\hline
EM-3-CM5      & 1.8(CM5)    & 0.02 & 0.0   &     \\
              & 1260(Sun)   &      &       &     \\\hline
EM-all-CM5    & 2.1(CM5)    &      &       & 0.5 \\
              & 120(Sun)    &      &       &     \\\hline
AVS Rendering & 3.5(550x580 &      &       &     \\
Modules       & window)     &      &       &     \\\hline
\end{tabular}
\end{center}
\caption{Timings of calculations and communications (in second)}
\label{emstiming}
\end{table}
