WILEY

John Wiley & Sons, Ltd. Baffins Lane, Chichester West Sussex, PO19 1UD, England Telephone: (0243) 779777 Telefax: (0243) 775878 Telex: 86290

REFEREE’S REPORT

CONCURRENCY: Practice and Experience

A: General Information

Please return to: Geoffrey C. Fox Concurrency: Practice and Experience Syracuse University Northeast Parallel Architectures Center 111 College Place Syracuse, New York 13244-4100 OR CPANDE@hamlet.caltech.edu gcf@.npac.syr.edu or fox@suhep.bitnet

Electronic skeletons of this form may be obtained. For information, send email to citlib@ccsf.caltech.edu.

If problems call (315) 443-1723 or (315) 443-2163

If in a hurry, FAX to (315) 443-4741 or (315) 443-1973

For administrative support, contact Terri Canzian, kea@ccsf.caltech.edu, Telephone: (602) 527-3362, Fax: (602) 527-4039

Please fill in Summary Conclusions (Sec. C) and details as appropriate in Secs. D, E and F.

B: Refereeing Philosophy

We encourage a broad range of readers and contributors. Please judge papers on their technical merit and separate comments on this from those on style and approach. Keep in mind the strong practical orientation that we are trying to give the journal. Note that the forms attached provide separate paper for comments that you wish only the editor to see and those that both the editor and author receive. Your identity will of course not be revealed to the author.

C: Paper Number:

Paper Title:

Author(s):

Referee:

Address:

Signature:

Referee Recommendations. Please indicate overall recommendations here, and details in following sections.

(1) publish as is

(2) accepted provided changes suggested are made

(3) reject

D: Referee Comments (For Editor Only)

E: Referee Comments (For Author and Editor) Paper number:

F: Presentation Changes

Title Changes:

Abstract Changes:

Reference Changes/Additions:

Other Comments (Grammar, etc.):