The following data is collected from Extended Transient-Midterm
Stability program version 3 processng a 2000 bus dat set.
The size of the matrix is $2304 \times 2304$.

\begin{tabular}{|c|c|c|c|c|c|}
\hline
Computer & Order & Factorization 1 & Factorization 2 & Factorization 3 &
Factorization 4 \\ \hline
Sparc 2 with 64M RAM\diag & 2.379861 sec & 2.29896 sec & 1.969902 & 1.999899 sec &
0.829917 sec \\ \hline
Sparc 10 model 31 with 128M RAM & 2.79891 sec & 1.559943 sec & 1.559943 sec &
0.519948 sec & 0.549945 sec \\ \hline
Sparc 2 with 64M RAM & 2.149884 sec & 1.889910 sec & 1.879911 sec &
0.859914 sec & 1.829916 sec \\ \hline
\end{tabular}
