

\documentstyle[11pt]{article}

\input{psfig}

\textwidth=6.0in
\textheight=8.5in
\topmargin=-0.5in
\oddsidemargin=0.25in
 

\begin{document}

\setcounter{page}{67}
\setcounter{figure}{16}


\begin{figure}
\vspace*{8.0truein} 
\caption{Model of the proposed EPRI Dynamic Security Assessment program,
from the EPRI meeting on On-Line Transient Stability Assessment, 
December 1993.}
\label{fig:DSA}
\end{figure}


\end{document}


