\documentstyle{csart}

\begin{document}

%\sloppy

\title{Some Lattice-based Scientific Problems, Expressed in Haskell}

\author{D.B. Carpenter}
\address{Department of Electronics and Computer Science, \\
         Southampton University, \\
         Southampton, S09 5NH} 

\maketitle

%\newpage

\tableofcontents
%\listoftables

%\newpage

\setcounter{page}{1}
%\pagestyle{plain}

\include{introduction}
\include{problems}
\include{lattice}
\include{implementations}
\include{discussion}

\include{bibliography}

\appendix

\include{appendices}

\end{document}

