Fortran  C++  MPI  architecture host
Nag f90 GNU g++ MPICH/P4  RS600  ben
Nag f90 GNU g++ MPICH/P4  SUN 4  bacchus
AIX xlf90 AIX mpCC MPICH/EUI  SP2  sp2

Table 1: Some installation platforms