Fortran C++ MPI architecture host Nag f90 GNU g++ MPICH/P4 RS600 ben Nag f90 GNU g++ MPICH/P4 SUN 4 bacchus AIX xlf90 AIX mpCC MPICH/EUI SP2 sp2

Table 1: Some installation platforms