                                                                                                       0

                                                                                                       5

                                                                                                10

                                                                                                15

                                                                                                20

                                                                                                25

32

Sparc10

8 Ultra 16 PC 8 Ultra + 8

PC

8 Ultra +

15 PC

8 Ultra +

16 PC + 1

Sparc5

Total Time (min)