0 0.02 0.04 0.06 0.08 Density (atoms/A^{-2})

-146

-145

-144

-143

-142

Total Energy (K)

0.030 0.040 0.050 0.060 0.070 Coverage (A^{-2})

-142.0

-141.5

-141.0

-140.5

-140.0

E/N (K)

0.065 0.075 0.085 0.095 0.105 0.115 Coverage (A^{-2})

-145.0

-140.0

-135.0

-130.0

-125.0

E/N (K)

0.8 1.3 1.8 2.3 2.8 3.3 3.8 4.3 4.8 5.3 5.8 Temperature (K)

-148.0

-147.0

-146.0

-145.0

-144.0

-143.0

-142.0

-141.0

-140.0

E/N (K)

14 11.5 12.5 13.5 14.5 15.5 16.5 Inverse coverage (A^2)

-142.0

-141.0

-140.0

-139.0

-138.0

-137.0

Energy per particle (K)

0.0 5.0 10.0 r(A) 0.0

0.5

1.0

1.5 g(r) d=0.0256 d=0.0421 d=0.0689

0 1 2 3 4 5 6 Temperature (K) 0

1

2

3

4

5

6

7

Specific Heat

0.0 1.0 2.0 3.0 4.0 5.0 6.0 k(A^{-1}) 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5

S(k) d=0.0256 d=0.0421 d=0.0689

0.0

5.0

10.0

S(k) d=0.0918

1.0 2.0 3.0 4.0 5.0 6.0 7.0 z(A) 0.0

0.1

0.2

0.3

0.4 ρ(z) (A^{-2}) d=0.118 d=0.120 d=0.127