0.0 5.0 10.0 15.0 20.0 r -1.200

-1.000

-0.800

-0.600

-0.400

-0.200

power fit

0.0 5.0 10.0 15.0 20.0

-0.20

-0.15

-0.10

-0.05

0.00

Fluctuating lattice fits

N=3000, β=2.3

exponential fit