\input   mac.tex
\input   moremac.tex

\nopagenumbers
\centerline{}
\vskip16.0cm
\centerline{FIGURE 3}
\medskip
\noindent
The error $\vert \rho(n) - N_2(n) \vert / N_2(n)$. The top curve is 
$E^{max}(n)$, the upper limit of the error, while the bottom curve is a local 
average of the error.

\vfill
\end
