\input   mac.tex
\input   moremac.tex

%
% FIGURE CAPTIONS
%

\nopagenumbers
\centerline{ }
\vskip16.0cm
\centerline{FIGURE 1}
\medskip
\noindent
$N_2^{min}$ and $N_2^{max}$, the upper and lower boundaries of the Goldbach 
curve. All values of $N_2(n)$ lie between these boundaries. 
The smooth curve is $\rho_0(n)$, the lower bound of the Littlewood-Hardy
formula.
\vfill\eject
%
\centerline{ }
\vskip16.0cm
\centerline{FIGURE 2}
\medskip
\noindent
A section of the Goldbach curve. The arrows at the right of the figure
denote values of $\rho(n)$, for $n \approx 8.05 \times 10^6$ and having
the factor structure shown beside the arrow.
\vfill\eject
%
\centerline{}
\vskip16.0cm
\centerline{FIGURE 3}
\medskip
\noindent
The error $\vert \rho(n) - N_2(n) \vert / N_2(n)$. The top curve is 
$E^max(n)$, the upper limit of the error, while the bottom curve is a local 
average of the error.

\vfill
\end
