We have measured the dynamical critical exponents for the
Swendsen-Wang and the Wolff cluster update algorithms, as well as a 
number of variants of these algorithms, for the $q=2$ and $q=3$ Potts
models in two dimensions. We find that although the autocorrelation
lengths differ considerably between algorithms, the critical exponents
are the same.
