% this is to set up the table for average maximum cluster size 
% for different ratios of the 3 energy conserving operators at 
% zero temperature and at critical point (beta = 0.738) for fully 
% frustrated cubic lattice, lattice size 16x16x16, 10,000 sweeeps 
% results are in 
% ~han/project/frustrated/3d/src_all/10_operation/bond/paper/case1 - case5
%
\begin{tabular}{cccccc} 
\quad & \multicolumn{3}{c}{Ratios of Operators} \quad &              & \quad \\
\quad &    $p_1$    &    $p_2$   & $p_{3}$  \quad & Max cluster size & \quad \\ 
\tableline
\quad &      1      &      0      &     0       \quad &  0.96208(17) & \quad \\ 
\quad &      0      &      1      &     0       \quad &  0.96212(17) & \quad \\
\quad &      0      &      0      &     1       \quad &  0.95745(7)\phantom{0}  & \quad \\
\quad & $1 \over 3$ & $1 \over 3$ & $1 \over 3$ \quad &  0.96082(10) & \quad \\
\quad & $1 \over 4$ & $1 \over 4$ & $1 \over 2$ \quad &  0.95981(15) & \quad \\
\end{tabular}
