operations

Energy Config  G  F  E(1)  E(2)  D  C  B  A
-6J  1  0.000143 0.002886 0.004871 0.009743 0.020705 0.088389 0.419626 0.453636
-4J  2  0.000624 0.010525 0.014210 0.014210 0.090594 0.257826 0.612012  0
-2J  3,4 0.002729 0.036839  0  0  0.396384 0.564048  0  0
0J  5,6 0.011938 0.120890  0  0  0.867171  0  0  0
2J  7  0.052235 0.352630  0  0.595135  0  0  0  0
2J  8  0.052235 0.352630 0.595135  0  0  0  0  0
4J  9  0.228550 0.771450  0  0  0  0  0  0
6J  10 1.000000  0  0  0  0  0  0  0