\documentstyle[11pt]{article}
 
\input epsf
 
\begin{document}
	
	Dear Michele Burchill:


	It is wonderful to have lease extending and stay here
	one more year.
	  
	Frankly, my wife and I had been considering to move out to the
	new apartment next to the Remington Garden, just because
	they have a new refrigerator.

	I have been staying in Syracuse for six years and each
	two year in Clarendon and Nob Hill Apt.
	I think Hidden Valley Apt is the best, very roomy, quite
	,warm in winter, near to school and good maintenance. 
	We have been staying here for two years and absolutely
	satisfy everything except old(we think) refrigerator
	that always make a big ice inside.

	Comparing four of my friends living here, our refrigerator 
	is worst and  we had asked to check once when we first moved 
	in here and maintenance said we should turn off and melt all ice 
	twice a year.  We have done they said but now it is worse than
	ever, every day some rust water comes out from bottom of it.

	My wife, who is pregnant now, have wiped out water everyday and
	one day morning she slipped on the water and almost fell down
	on the floor.  Before this happened, I didn't listen carefully
	what she complained about refrigerator.
	
	Please Michele, I am asking to change our refrigerator.
	If you think our refrigerator is still fine, can you
	change it to the other one which is in vacancy?


	Thank you for your kind consideration and wishing your family, 
	especially your new baby, many happy returns of the day.


	116 - D
	Sung-Hoon Ko.

\end{document}