 Matrix Size : 100
 Hypercube Dimension : 3 
 Mesh structure is : 4 x 2 
 Total Number of processors : 8 
 100,100 Matrix multiplication , elapsed time : 1775
 
 Distribution takes 3677
 Preconditioning takes 1347

 Multiplication takes 2635

 SpeedUp(100x100,8) = 0.6736

 Matrix Size : 200
 Hypercube Dimension : 3 
 Mesh structure is : 4 x 2 
 Total Number of processors : 8 
 200,200 Matrix multiplication , elapsed time : 12825
 
 Distribution takes 14781
 Preconditioning takes 6073

 Multiplication takes 26101

 SpeedUp(200x200,8) = 0.4913

 Matrix Size : 400
 Hypercube Dimension : 3 
 Mesh structure is : 4 x 2 
 Total Number of processors : 8 
 400,400 Matrix multiplication , elapsed time : 111226
 
 Distribution takes 59651
 Preconditioning takes 29587

 Multiplication takes 49082
 SpeedUp(400x400,8) = 2.2661

 Matrix Size : 600
 Hypercube Dimension : 3 
 Mesh structure is : 4 x 2 
 Total Number of processors : 8 
 600,600 Matrix multiplication , elapsed time : 409122
 
 Distribution takes 134695
 Preconditioning takes 82452

 Multiplication takes 132561
 SpeedUp(600x600,8) = 3.0862


 Matrix Size : 100
 Hypercube Dimension : 2 
 Mesh structure is : 2 x 2 
 Total Number of processors : 4 
 100,100 Matrix multiplication , elapsed time : 1775
 
 Distribution takes 4670
 Preconditioning takes 1786

 Multiplication takes 3534
 SpeedUp(100x100,4) = 0.5022

 Matrix Size : 200
 Hypercube Dimension : 2 
 Mesh structure is : 2 x 2 
 Total Number of processors : 4 
 200,200 Matrix multiplication , elapsed time : 12424
 
 Distribution takes 18783
 Preconditioning takes 8503

 Multiplication takes 16044
 SpeedUp(200x200,4) = 0.7743

 Matrix Size : 400
 Hypercube Dimension : 2 
 Mesh structure is : 2 x 2 
 Total Number of processors : 4 
 400,400 Matrix multiplication , elapsed time : 110842
 
 Distribution takes 75352
 Preconditioning takes 45836

 Multiplication takes 77868
 SpeedUp(400x400,4) = 1.4234

 Matrix Size : 600
 Hypercube Dimension : 2 
 Mesh structure is : 2 x 2 
 Total Number of processors : 4 
 600,600 Matrix multiplication , elapsed time : 398433
 
 Distribution takes 170468
 Preconditioning takes 139454

 Multiplication takes 236760
 SpeedUp(600x600,4) = 1.6828


 Matrix Size : 100
 Hypercube Dimension : 1 
 Mesh structure is : 2 x 1 
 Total Number of processors : 2 
 100,100 Matrix multiplication , elapsed time : 1776
 
 Distribution takes 5031
 Preconditioning takes 1868

 Multiplication takes 5336
 SpeedUp(100x100,2) = 0.3328

 Matrix Size : 200
 Hypercube Dimension : 1 
 Mesh structure is : 2 x 1 
 Total Number of processors : 2 
 200,200 Matrix multiplication , elapsed time : 12214
 
 Distribution takes 20255
 Preconditioning takes 9528

 Multiplication takes 22383
 SpeedUp(200x200,2) = 0.5456

 Matrix Size : 400
 Hypercube Dimension : 1 
 Mesh structure is : 2 x 1 
 Total Number of processors : 2 
 400,400 Matrix multiplication , elapsed time : 111273
 
 Distribution takes 80312
 Preconditioning takes 61125

 Multiplication takes 139934
 SpeedUp(400x400,2) = 0.5456
