\documentstyle[11 pt,psfig]{article}

%\usepackage{times}

\textwidth6.0in
\textheight8.0in
\voffset-0.5in
\hoffset-0.5in

\renewcommand{\familydefault}{ptmr}
% set font for Times-Roman

\includeonly{title}

\begin{document}

\include{title}
\include{introduction}
\include{model}
\include{loopBound}
%\include{communication}
\include{appendixA}
\include{appendixB}
\include{reference}
\end{document}

